         180           8
   4.04929945568826        3.72898057762979        3.29066223952074     
   2.88721723460191        2.61592427303569        2.36927278088430     
   2.20830037073054        2.18632001468662     
  -13.1478374749496       -14.1434062777254       -14.7391955801154     
  -15.3408352044786       -15.8533712027317       -16.1903062312797     
  -16.5449645230265       -16.7703097114251     
 -3.409326037848276E-004  0.000000000000000E+000
  0.993113756453723       0.000000000000000E+000
  0.996101705863095       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
