         180           8
   4.91507558390373        4.48297095817562        4.11024940831292     
   3.78560986163437        3.45894062976463        3.15206895477691     
   2.95271058279590        2.90787653351856     
  -14.8029386707966       -15.0894024324036       -15.3243550214353     
  -15.5693720597808       -15.8298485756320       -16.0525201514433     
  -16.2568985875474       -16.5832511322788     
 -2.931973882717046E-004  0.000000000000000E+000
  0.993031405035551       0.000000000000000E+000
  0.996053915032605       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
