         180           8
   4.61715431154138        4.29348457743678        3.94349190070511     
   3.59934248426289        3.30810153219394        3.06519983716994     
   2.87829958195776        2.84430705405177     
  -14.6174298042910       -14.9794636519864       -15.2561029556738     
  -15.5020658894582       -15.8008580122209       -16.0756341120892     
  -16.3519402879221       -16.6073527197897     
 -4.167668764682880E-004  0.000000000000000E+000
  0.993217201722144       0.000000000000000E+000
  0.996403509872043       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
