         180           3
   4.84907111862992        2.92316049145180        1.41516649978015     
   6.47836625079724        6.75526001993011        6.94418668411740     
 -1.353802618631990E-003  0.000000000000000E+000
   1.00159846222475       0.000000000000000E+000
  0.998795931896053       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
