         180           8
   4.70294636954931        4.37798273688107        4.03199191181658     
   3.68038771560843        3.37164431577938        3.07445912048572     
   2.88770283850989        2.72800529574652     
  -14.6238281684292       -15.1289997759938       -15.3471075781197     
  -15.5864485425536       -15.7852291305266       -15.9815041051112     
  -16.2060286745725       -16.4009629107789     
 -4.793721328717696E-004  0.000000000000000E+000
  0.993242668245364       0.000000000000000E+000
  0.996470016076023       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
