         180           8
   5.07586566718353        4.64792051003400        4.28482839995684     
   3.94965791075126        3.64006527954361        3.35064593631316     
   3.13069608247783        3.05627399986224     
  -14.8240061943047       -15.1737413522991       -15.4141034754856     
  -15.6532627509543       -15.8497036828094       -16.1218336791083     
  -16.4497110359629       -16.7826149135499     
 -5.047351280152080E-004  0.000000000000000E+000
  0.993320288304498       0.000000000000000E+000
  0.996516958584198       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
