         180           8
   4.77066754175766        4.40197947189254        4.03335042575439     
   3.70176517170834        3.36488883843630        3.11202880367749     
   2.94855665141281        2.96480718110111     
  -13.3302447592097       -14.5440915416391       -15.1032003994176     
  -15.5285875721725       -16.0149443556137       -16.3976605084812     
  -16.7028743251369       -17.0625876309681     
 -5.696378224252814E-004  0.000000000000000E+000
  0.993503141746173       0.000000000000000E+000
  0.996629876073426       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
