         180           8
   5.33448893676436        4.92979312943114        4.56078990138696     
   4.18332197215629        3.83787919149893        3.54289362684853     
   3.31548098796857        3.08252054000583     
  -15.5503815960267       -15.6527624197299       -15.8942603947239     
  -16.0990709456076       -16.2717867142900       -16.4718073660184     
  -16.6464599564592       -16.6597627685186     
 -5.876884711533170E-004  0.000000000000000E+000
  0.993579525580184       0.000000000000000E+000
  0.996712641387117       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
