         180           8
   4.98435359439636        4.60145755138918        4.26361825063316     
   3.95859816542273        3.64054067870556        3.34367030639682     
   3.12427538409418        3.03791874272439     
  -15.0797471196130       -15.4534135205658       -15.6353762517021     
  -15.8607303567982       -16.1121652906943       -16.3659444530044     
  -16.5931211488862       -16.9129244549248     
 -6.669208098205418E-004  0.000000000000000E+000
  0.993672713668002       0.000000000000000E+000
  0.996913833486188       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
