         180           8
   5.65650149603341        5.22747409010346        4.83510317187128     
   4.45917920486873        4.11787328155853        3.81372418185948     
   3.52598214855494        3.42966647108792     
  -15.2571121536219       -15.4665253635056       -15.6763345087779     
  -15.9035588602232       -16.1170559583811       -16.3266904576621     
  -16.5170458657893       -16.8112607395633     
 -6.444148751017566E-004  0.000000000000000E+000
  0.993715740048372       0.000000000000000E+000
  0.996973783760914       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
