         180           3
   4.33616864524413        2.42553037046222        1.21652217194620     
   7.68560752848271        6.06901005169229        6.83363183534180     
 -1.333804400860003E-003  0.000000000000000E+000
   1.00182067338800       0.000000000000000E+000
  0.999088524015592       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
