         180           8
   5.03807229778838        4.64339818554595        4.30618870796229     
   3.98117593141693        3.65229829612620        3.39543171681535     
   3.22597004858609        3.20474723140831     
  -14.0271869951598       -15.3207303013110       -15.8204613557038     
  -16.2041000656892       -16.6957305442221       -17.0028936771233     
  -17.1913786398305       -17.3927698653513     
 -6.851174842993257E-004  0.000000000000000E+000
  0.993737790147692       0.000000000000000E+000
  0.996976480986880       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
