         180           8
   5.41062653482001        4.94077027229082        4.56968763177116     
   4.25359487606678        3.93681505884639        3.64756034365806     
   3.42292147461692        3.36589567246952     
  -15.2231321891601       -15.4933068360256       -15.7908357101233     
  -16.1001649603523       -16.3657642265568       -16.6055387318498     
  -16.7997534383111       -17.1877073664304     
 -5.728467036992007E-004  0.000000000000000E+000
  0.993469489484840       0.000000000000000E+000
  0.996798064299266       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
