         180           8
   4.68036315666329        4.32495292552217        3.96522059757627     
   3.63827350770773        3.33906248774058        3.06479392870251     
   2.87699352646551        2.77358184453893     
  -14.6791928841152       -15.0322014259789       -15.2503810110504     
  -15.5022534204737       -15.7865623088684       -16.0313392357118     
  -16.2817455773238       -16.6006148758636     
 -4.196913551229438E-004  0.000000000000000E+000
  0.993159350053358       0.000000000000000E+000
  0.996461453657341       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
