         180           8
   4.98168029304652        4.58085749217337        4.23128545842338     
   3.90498141412451        3.60020291113843        3.35453277520106     
   3.15410070083409        3.13187155366911     
  -14.7107845597842       -15.0736709216483       -15.3351057694495     
  -15.6090330405572       -15.8870644856591       -16.1027137172867     
  -16.2848956495678       -16.5849243336137     
 -3.987803532423936E-004  0.000000000000000E+000
  0.993216652486372       0.000000000000000E+000
  0.996504243788224       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
