         180           8
   4.43644964116078        4.14402336602329        3.79590458481101     
   3.47050828075925        3.18233804586363        2.92452168863926     
   2.76037238645023        2.77105067273691     
  -14.5011257263634       -14.9556092775260       -15.2466203567799     
  -15.5549976020859       -15.8611792610808       -16.0945267140875     
  -16.4021849085542       -16.6965059030733     
 -4.593230888209008E-004  0.000000000000000E+000
  0.993354893707654       0.000000000000000E+000
  0.996632055794496       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
