         180           8
   4.72757932113165        4.41083488520875        4.06584810695869     
   3.73735506198400        3.41005448603848        3.12313031205922     
   2.92501909311624        2.92610382911124     
  -14.1990589528056       -14.6748517066237       -14.9491042218865     
  -15.2144068374657       -15.5101757493674       -15.7417654145082     
  -16.0248436757324       -16.3074717479047     
 -4.570507135254719E-004  0.000000000000000E+000
  0.993380999652023       0.000000000000000E+000
  0.996682254731388       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
