         180           8
   5.51181377529616        5.06905984142115        4.67720369018680     
   4.29447504504531        3.95273265135475        3.66945546513736     
   3.44900597337859        3.53325370252120     
  -13.1715468089354       -13.9753378619594       -14.5064817637884     
  -15.1770029672625       -15.8379733362743       -16.3170867382769     
  -16.6482352608980       -17.0432977046128     
 -4.610630934151485E-004  0.000000000000000E+000
  0.993613094334494       0.000000000000000E+000
  0.996762731350120       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
