         180           8
   4.95719265494515        4.65350736956720        4.27577709659721     
   3.92283486836057        3.59758445180402        3.33800889566648     
   3.08189685235051        3.13610402148528     
  -14.0785422554887       -14.4124380834665       -14.6465527818222     
  -14.8842118137088       -15.1439636727302       -15.3472085629009     
  -15.5345535937593       -15.8168473227924     
 -3.218645980365717E-004  0.000000000000000E+000
  0.993157207776358       0.000000000000000E+000
  0.996249129787458       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
