         180           8
   5.15034641677731        4.67903447332492        4.31314240564079     
   3.95573606452434        3.60227994685369        3.31477380523038     
   3.09464730737741        2.99522012872670     
  -14.0709117975780       -14.3549749178702       -14.5938042938392     
  -14.8475609326287       -15.0941338575071       -15.3092803957672     
  -15.5202084286720       -15.8469142848969     
 -3.846930211033541E-004  0.000000000000000E+000
  0.993334377763150       0.000000000000000E+000
  0.996524329622882       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
