         180           8
   4.95212328762241        4.54929069089720        4.17987658715648     
   3.83109967735752        3.50483699403727        3.22059685026848     
   2.98276461408374        2.89058582545009     
  -14.3174644312476       -14.5627457387037       -14.7689800572345     
  -14.9568446881568       -15.1193550887413       -15.2997565109033     
  -15.4994227699852       -15.8333451466719     
 -4.035561908613915E-004  0.000000000000000E+000
  0.993414203156735       0.000000000000000E+000
  0.996634074402482       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
