         180           8
   4.43397317644308        4.13935851453288        3.77947526962904     
   3.44599902708467        3.14307259222465        2.88167248402046     
   2.69437205812390        2.63285152548582     
  -13.8948769571043       -14.3252927692721       -14.5719241871528     
  -14.8663313147435       -15.1666018249097       -15.4393550974314     
  -15.6980555075498       -16.0844111764801     
 -4.108872801097542E-004  0.000000000000000E+000
  0.993444121697601       0.000000000000000E+000
  0.996729068847931       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
