         173           8
   4.65802003027001        4.21629044865529        3.90506100585137     
   3.54943221708756        3.23871422856505        3.01072339769404     
   2.84729444491988        2.84340836162560     
  -13.7013248544587       -14.0148181254684       -14.3019586656893     
  -14.6160992657484       -14.8835252997453       -15.2027562371885     
  -15.5375678196461       -15.9676835335247     
 -4.010746976591585E-004  0.000000000000000E+000
  0.993459251048458       0.000000000000000E+000
  0.996712026847398       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
