         180           8
   2.90529967800428        2.42992809669812        2.07499901575198     
   1.70782690784502        1.19640055325500       -2.93893547245200     
  -26.9011575298762       -117.215760037179     
  -11.9277798398760       -12.2586030266414       -12.5093691274185     
  -12.7165885697094       -13.2641717309540       -23.2848568017606     
  -100.653963565217       -452.400450064095     
  2.074369036241822E-004  0.000000000000000E+000
  0.992212428363332       0.000000000000000E+000
  0.995302304883482       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
