         180           8
  -58.1484043832498       -36.4032851218485       -24.0865876532387     
  -8.34960409700770        2.54743746882851        1.09908404085461     
 -0.230629327835814       -3.03092201104814     
  -15.7334056999481       -23.3171045024783       -20.6069019187571     
  -15.5576724857590       -12.8252231751949       -13.2289508196516     
  -13.6362898683936       -14.4193118063057     
  1.699352844737724E-004  0.000000000000000E+000
  0.992171200643450       0.000000000000000E+000
  0.995193402328548       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
