         176           8
   2.41042905603458        2.06889062279229        1.67476124180066     
   1.36238805343328        1.09735495250296       0.843130222955743     
  0.660363115704720       0.607587173268756     
  -11.8708527634726       -12.1674433331194       -12.4546555458194     
  -12.7473352572900       -13.0428402867611       -13.2485826604183     
  -13.4736696778841       -13.6532707625383     
  1.401098186565641E-004  0.000000000000000E+000
  0.992301289929915       0.000000000000000E+000
  0.995407408849664       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
