         161           8
   2.04317497122537        1.81136902924917        1.41871497984364     
   1.09061073357370       0.856639326659005       0.622940801720864     
  0.418868873535761       0.441099599524264     
  -11.8794963054740       -12.2504912975932       -12.5004726200617     
  -12.8010173156522       -13.1117566938525       -13.2285854786130     
  -13.4161790488638       -13.7731120946935     
  3.009177387192798E-004  0.000000000000000E+000
  0.991967664084046       0.000000000000000E+000
  0.995038175197412       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
