         166           8
   5.14903490020406        4.32605211435819        3.72984019277053     
   3.13782052321008        2.57032819360200        1.97819713470268     
   1.40366574112299        1.06558136463621     
  -7.77037135946384       -7.93366973537599       -8.02163436716612     
  -8.16374906310665       -8.28031654683660       -8.45435784089387     
  -8.50193424730167       -8.60960591098713     
  2.632565287107131E-004  0.000000000000000E+000
  0.992136010905343       0.000000000000000E+000
  0.994501716442012       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
