         106           8
   5.85102646000238        5.46364769937243        5.03636688505089     
   4.23300181793989        3.16445661598411        2.31230493035211     
   1.98215201419431        1.61125399677769     
  -9.23363156231525       -9.44178388626958       -9.55434123548083     
  -9.81178124011409       -10.2708952370682       -10.6332873433145     
  -10.6594195859024       -10.7447270176990     
 -2.720147244419389E-004  0.000000000000000E+000
  0.992980004045398       0.000000000000000E+000
  0.995689885843653       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
