         170           8
   5.94269201553418        5.34951766818412        4.72393242118820     
   4.11222625125318        3.49354554076782        2.97384647393209     
   2.46076681794729        1.95504916085722     
  -9.25962652906657       -9.35389264635805       -9.48094096102224     
  -9.66938987385638       -9.86743995717832       -10.1261884616094     
  -10.3953962407056       -10.6483337205327     
 -1.826721682671317E-005  0.000000000000000E+000
  0.992370823149068       0.000000000000000E+000
  0.995411625815648       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
