         180           8
   5.85035193172389        5.25447626982533        4.62152842119603     
   4.04723970132434        3.45611985008909        2.87267899512101     
   2.34325342418324        1.78894250876303     
  -8.99694887674725       -9.02233216755123       -9.14864611730622     
  -9.32519767105584       -9.55394597753603       -9.83369478991504     
  -10.1371494945693       -10.3841357858887     
 -8.470144251116514E-005  0.000000000000000E+000
  0.992681829900740       0.000000000000000E+000
  0.995556151859162       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
