         180           3
   12.1967851598373        10.1830523467905        8.04975476262287     
   8.06002510527409        8.28095210358051        8.75270701130866     
 -1.358030318959593E-003  0.000000000000000E+000
   1.00190710237012       0.000000000000000E+000
  0.999087598872186       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
