         180           8
   6.78606187169362        6.03765699507574        5.44048725382367     
   4.82353628341856        4.25692362670306        3.67933189590464     
   3.08916910297820        2.62469907102506     
  -10.6990884601144       -10.7513372047123       -10.8745773183054     
  -11.0324609435792       -11.2320684372240       -11.4898118507972     
  -11.7871162229986       -12.0718154208432     
 -4.297320599205605E-004  0.000000000000000E+000
  0.993030596770667       0.000000000000000E+000
  0.996018461090523       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
