         180           8
   6.71016241857894        6.01117184953621        5.40062732210433     
   4.83711609839948        4.27476108958528        3.66454849797826     
   3.10459080665840        2.59061299356387     
  -10.6760096433233       -10.6223389913942       -10.7567455415456     
  -10.9249461127429       -11.1482699825764       -11.3978851472929     
  -11.6628262117914       -11.9119608078118     
 -4.277413403277666E-004  0.000000000000000E+000
  0.993109989474049       0.000000000000000E+000
  0.996109004750257       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
