         180           8
   6.68474010261771        5.96701143489734        5.36247807702601     
   4.74789126992774        4.13731994100734        3.57273180861749     
   3.02024805547076        2.52769382510186     
  -10.6080239198472       -10.6552214519034       -10.7655356432373     
  -10.8867512522996       -11.1064680095770       -11.3788821384998     
  -11.6089688814236       -11.9773393287844     
 -4.623695543784758E-004  0.000000000000000E+000
  0.993198707326778       0.000000000000000E+000
  0.996163986241696       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
