         180           8
   4.06361611156202        3.35869077505072        2.78960102854940     
   2.19474251641195        1.64318139831338        1.14008567964761     
  0.659431225689579       0.235377116132719     
  -9.44447303931451       -9.88867806815211       -10.1376239138409     
  -10.4325174467392       -10.6982937568875       -10.9585739216418     
  -11.2173991584074       -11.4588488361416     
 -6.213906863369641E-004  0.000000000000000E+000
  0.993521120094925       0.000000000000000E+000
  0.996493007662429       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
