         180           3
   4.72926070740497        6.78273265194780        8.60464472425911     
   8.23843133279899        9.01096365119720        9.54771453944234     
 -1.568522538122208E-003  0.000000000000000E+000
   1.00160449448637       0.000000000000000E+000
  0.998902063445062       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
