         180           8
  0.915102382070308       0.787711807028367       0.711027888033536     
  0.608124058826105       0.509191408866320       0.417970512284189     
  0.310541964132223       0.233918625068018     
  -14.4286115025645       -14.2472080152491       -13.9019287350056     
  -13.4727094634425       -13.0666435198704       -12.7166706791934     
  -12.3997631312833       -12.1045385229993     
 -3.411370767808954E-004  0.000000000000000E+000
  0.992701048690550       0.000000000000000E+000
  0.995924771965302       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
