         180           8
   3.46215971095003        3.22719079056739        3.06272165287043     
   2.90006689223525        2.71988088354218        2.59269143758235     
   2.46295043980098        2.32638971968980     
  -14.9508045940915       -14.7391332137234       -14.3876314463811     
  -14.0279945326379       -13.6351424915951       -13.1725707701080     
  -12.8475402924518       -12.5807509480787     
 -2.379834946316395E-004  0.000000000000000E+000
  0.992768810823651       0.000000000000000E+000
  0.995956458294772       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
