         180           8
   4.40803963523648        4.24141906730783        4.06817952793330     
   3.90435349289726        3.74484197935968        3.63715075531589     
   3.54953226196616        3.34565310550978     
  -14.9068492140893       -14.6583878040809       -14.3335520367532     
  -13.9824766952342       -13.5803890633755       -13.1768257939049     
  -12.8235317617854       -12.4462738655683     
 -2.772741003896779E-004  0.000000000000000E+000
  0.992975252034804       0.000000000000000E+000
  0.996015336752127       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
