         180           3
   4.33019909950537        5.96580321298770        7.92195461088474     
   7.04306301727766        7.71995949510492        8.48786110559507     
 -1.266575681667520E-003  0.000000000000000E+000
   1.00152373393868       0.000000000000000E+000
  0.998858917632921       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
