         180           8
   4.32465505796587        4.17058098678183        4.01932054748065     
   3.88242930891862        3.70319887158747        3.55239991455205     
   3.43953412832223        3.33372505898421     
  -14.8756165940405       -14.6498150105149       -14.3441099176833     
  -13.9860229663281       -13.6125713248139       -13.2216929383969     
  -12.8324790689808       -12.4852820561365     
 -3.245420164850393E-004  0.000000000000000E+000
  0.993029255158816       0.000000000000000E+000
  0.996125378120978       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
