         180           8
   3.86187194610630        3.68745086038231        3.47095838658742     
   3.31108307928387        3.17704776203567        3.02745432724706     
   2.84263013460933        2.81569348602459     
  -14.7270444884831       -14.5428582118372       -14.2407243405237     
  -13.9009750219443       -13.4602443807505       -12.9578741693715     
  -12.5089208746515       -12.2183198625204     
 -3.835476806006740E-004  0.000000000000000E+000
  0.993242927257929       0.000000000000000E+000
  0.996306787763792       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
