         180           8
  0.585468151046639       0.495073472963418       0.409859672350787     
  0.313808652498307       0.240362006051180       0.169481286943822     
  0.109587553115989      -3.023855248861708E-002
  -14.0694786722265       -13.8504720172679       -13.5247206690643     
  -13.1453824742955       -12.7498876993970       -12.3562197274524     
  -11.9552883951454       -11.6294333205955     
 -3.285914277008416E-004  0.000000000000000E+000
  0.992870891578252       0.000000000000000E+000
  0.995950351115829       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
