         180           8
   4.19978542602449        4.08304558421745        3.91889758652964     
   3.76319627820061        3.60641762678369        3.46013077124476     
   3.33825649414386        3.16350070457472     
  -14.4862726339652       -14.3398971468426       -14.0705091410966     
  -13.7218765455894       -13.2645685538047       -12.7810749023775     
  -12.4057553975665       -12.0622905625977     
 -2.198744478056980E-004  0.000000000000000E+000
  0.992947978181361       0.000000000000000E+000
  0.995980386592312       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
