         180           8
   4.46787835364721        4.16688437827953        4.00737163155134     
   3.88148667865429        3.74756877859348        3.59866500635966     
   3.44241732799289        3.32090012909822     
  -14.7972727055788       -14.6160971264319       -14.3121245774396     
  -13.9287573286368       -13.5014665355460       -13.0674395789779     
  -12.5735619323157       -12.1029239269754     
 -2.539982323024955E-004  0.000000000000000E+000
  0.993071979148741       0.000000000000000E+000
  0.995997694080159       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
