         180           8
   4.38997383705672        4.11081772165500        3.93958517892315     
   3.74490674867463        3.58928762479544        3.46253931507048     
   3.35301636790734        3.18971213501217     
  -14.6275572038728       -14.5456054130129       -14.2704698174941     
  -13.9677171770020       -13.5656704757249       -13.0994060250605     
  -12.6451182049552       -12.2184899347751     
 -3.210043458249202E-004  0.000000000000000E+000
  0.993168947972415       0.000000000000000E+000
  0.996073100085933       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
