         180           8
   10.4404323553359        10.3092696920696        10.1574576613198     
   10.0132823013934        9.84455077478697        9.64400822219774     
   9.48183071777208        9.41512851772096     
  -15.2695809925155       -15.1811608566399       -14.9720585715062     
  -14.7850682026087       -14.5530835177999       -14.1421003070793     
  -13.7146551527644       -13.4261957552357     
 -1.366461897815228E-005  0.000000000000000E+000
  0.993007761392492       0.000000000000000E+000
  0.996076784655680       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
