         180           8
   3.36744493385489        3.24557040379463        3.06860670045953     
   2.93024139085565        2.81371220505932        2.68633199044314     
   2.55312966230882        2.38128364128065     
  -14.5914162157748       -14.4235731708740       -14.0765278602986     
  -13.7544934665191       -13.4038007654644       -13.0096019659330     
  -12.5848568591920       -12.2238105575607     
 -2.895885261800645E-004  0.000000000000000E+000
  0.993083164820161       0.000000000000000E+000
  0.996198616579212       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
