         180           8
   4.08455296196767        3.90504374754211        3.74830946927765     
   3.59952028511496        3.43944130699661        3.28134624151190     
   3.14769171445693        3.01741153100548     
  -14.7333187901555       -14.5678250824054       -14.2936906966451     
  -13.9355495773738       -13.4664103451034       -12.9841269394045     
  -12.5517054180332       -12.0875733892010     
 -3.149089269138363E-004  0.000000000000000E+000
  0.993211521827038       0.000000000000000E+000
  0.996248685374450       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
